[#mp_units-system_reference-quantity_spec]
= xref:mp_units.adoc[mp&lowbar;units]::xref:mp_units/system_reference.adoc[system&lowbar;reference]::quantity&lowbar;spec
:relfileprefix: ../../
:mrdocs:

== Synopsis

Declared in `&lt;mp&hyphen;units&sol;framework&sol;system&lowbar;reference&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr static
auto quantity&lowbar;spec = Q;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
