[#mp_units-default_point_origin]
= xref:mp_units.adoc[mp&lowbar;units]::default&lowbar;point&lowbar;origin
:relfileprefix: ../
:mrdocs:

== Synopsis

Declared in `&lt;mp&hyphen;units&sol;framework&sol;quantity&lowbar;point&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;xref:mp_units/Reference.adoc[Reference] R&gt;
&lsqb;&lsqb;nodiscard&rsqb;&rsqb;
consteval
xref:mp_units/PointOriginFor.adoc[PointOriginFor&lt;get&lowbar;quantity&lowbar;spec(R&lcub;&rcub;)&gt;] auto
default&lowbar;point&lowbar;origin(R);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
