[#mp_units-get_quantity_spec-03]
= xref:mp_units.adoc[mp&lowbar;units]::get&lowbar;quantity&lowbar;spec
:relfileprefix: ../
:mrdocs:

== Synopses

Declared in `&lt;mp&hyphen;units&sol;framework&sol;reference&period;h&gt;`


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;nodiscard&rsqb;&rsqb;
consteval
xref:mp_units/QuantitySpec.adoc[QuantitySpec] auto
xref:mp_units/get_quantity_spec-0f.adoc[get&lowbar;quantity&lowbar;spec](xref:mp_units/reference.adoc[reference]);
----

[.small]#xref:mp_units/get_quantity_spec-0f.adoc[_» more&period;&period;&period;_]#


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;deprecated(&quot;2&period;6&period;0&colon; &grave;Q&grave; definition should not be marked &grave;final&grave;&quot;), nodiscard&rsqb;&rsqb;
consteval
xref:mp_units/QuantitySpec.adoc[QuantitySpec] auto
xref:mp_units/get_quantity_spec-00.adoc[get&lowbar;quantity&lowbar;spec](xref:mp_units/reference.adoc[reference])
requires std&colon;&colon;is&lowbar;final&lowbar;v&lt;Q&gt;;
----

[.small]#xref:mp_units/get_quantity_spec-00.adoc[_» more&period;&period;&period;_]#


[.small]#Created with https://www.mrdocs.com[MrDocs]#
